Data Used in Threads

Click here for the archive search form

Sorted by OBSID

OBSID Object Instrument Threads

144 G21.5-0.9 HRC-I HRC ExposureMap

459 3C 273 HETG/ACIS-S

Extract Spectrum & Make RMF/ARF, Grating Spectra for HETG/ACIS-S, Create HETG/ACIS-S garf

460 3C 273 LETG/HRC-S Create LETG garf

578 3C295 ACIS-S Source Detection

1198 3C 273 LETG/ACIS-S Grating Spectra for LETG/ACIS-S

1464 Jupiter LETG/HRC-S Correction of Aspect Offsets

1800 PKS2155-304 LETG/HRC-I Create LETG garf

1838 G21.5-0.9 ACIS-S

ACIS Exposure Map (Single & Multiple Chips), Restore WCS Info, Create True Color Image, PSF and Radial Profile

1842 G21.5-0.9 ACIS-I

Combine ObsID (combines with ObsID 1843)

1843 G21.5-0.9 ACIS-I

All General, Combine ObsID (combines with ObsID 1842)